)c (GeV/ Tp 0 5 10 15 20

)c b/GeV/ μ (_Tpdy/dσ^2d

10

210

310

410 = 5.02 TeV NNs p-Pb, _+ cΛ combination of analyses S 0 and pK

+π^-pK

< 0.04 y -0.96 <

3.7% lumi. uncertainty not shown ±

ALICE

+PYTHIA6

POWHEG

et al.

Shao

with EPS09NLO nPDF and multiplied by A

)c (GeV/ Tp 0 5 10 15 20

POWHEG

Data

1 10

)c (GeV/ Tp 0 5 10 15 20

et al.

Shao

Data

1 10